<template>
  <section id="services">
    <div class="container" style="margin-top:-15px">
      <div class="row">
        <div class="col-lg-12">
          <p>
            Uni-Vate offers a comprehensive rental property management and letting service for
            residential and commercial property portfolios. Our exceptional financial and facility
            management processes ensure that we are a cut above the rest and provides a competitive
            advantage.
          </p>
          <p>
            We pride ourselves on offering tailored solutions to property owners increasing the
            returns to our clients.
          </p>
          <p>Our rental property management and letting services include the following:</p>
        </div>
      </div>
      <div class="row">
        <div class="col-md-6"></div>
        <div class="col-md-6">
          <h4
            style="cursor:pointer"
            @click="$vuetify.goTo('#contactFoot', { duration: 2000, easing: 'easeInOutCubic' })"
          >
            Contact us for a quote
          </h4>
        </div>
      </div>

      <div class="row">
        <div align="left" class="col-lg-12">
          <div class="section-header">
            <h2>Our Services</h2>
          </div>
          <ul class="nav nav-tabs nav-justified" id="myTab" role="tablist">
            <li class="nav-item">
              <a
                class="nav-link-active"
                id="tenant-tab"
                data-toggle="tab"
                href="#tenant"
                role="tab"
                aria-controls="tenant"
                aria-selected="true"
                ><h5>Tenant Selection and Vacancy Management</h5>
              </a>
            </li>
            <li class="nav-item">
              <a
                class="nav-link-active"
                id="rent-tab"
                data-toggle="tab"
                href="#rent"
                role="tab"
                aria-controls="rent"
                aria-selected="false"
                ><h5>Rent Collection</h5>
              </a>
            </li>
            <li class="nav-item">
              <a
                class="nav-link-active"
                id="financial-tab"
                data-toggle="tab"
                href="#financial"
                role="tab"
                aria-controls="financial"
                aria-selected="false"
                ><h5>Financial Management</h5>
              </a>
            </li>
            <li class="nav-item">
              <a
                class="nav-link-active"
                id="admin-tab"
                data-toggle="tab"
                href="#admin"
                role="tab"
                aria-controls="admin"
                aria-selected="false"
                ><h5>Administration, Secretarial and Advisor</h5>
              </a>
            </li>
            <li class="nav-item">
              <a
                class="nav-link-active"
                id="maintenance-tab"
                data-toggle="tab"
                href="#maintenance"
                role="tab"
                aria-controls="maintenance"
                aria-selected="false"
                ><h5>Property Mainenance Management</h5>
              </a>
            </li>
          </ul>

          <div class="tab-content">
            <div class="tab-pane active" id="tenant" role="tabpanel" aria-labelledby="tenant-tab">
              <p></p>
              <p>• Advertising and Marketing</p>
              <p>• Financial and character screening of potential tenants</p>
              <p>• Showing</p>
              <p>• Determining affordability</p>
              <p>• Conclusion of contract and ensuring that any suspensive conditions are met</p>
            </div>
            <hr />
            <div class="tab-pane" id="rent" role="tabpanel" aria-labelledby="rent-tab">
              <p>• Monthly invoicing and collection via debit order</p>
              <p>• Credit Control including soft collections</p>
              <p>• Attorney Collections liaison</p>
              <p>• Liaison with metering companies</p>
            </div>
            <div class="tab-pane" id="financial" role="tabpanel" aria-labelledby="financial-tab">
              <p>
                • Account reconciliation and payment of net rental after approved operating expenses
              </p>
              <p>• Payment of approved expenses on behalf of Landlord.</p>
              <p>• Preparation and submission of monthly reports.</p>
              <p>• Monthly accounting of receipts and expenses.</p>
              <p>• Preparation of annual property budget.</p>
              <p>• Management of deposits in trust account.</p>
            </div>
            <div class="tab-pane" id="admin" role="tabpanel" aria-labelledby="admin-tab">
              <p>• Preparation and circulation of correspondence and notices to tenants</p>
              <p>
                • Preparation and conclusion of lease agreements, debit order forms and other legal
                documentation
              </p>
              <p>• Record maintenance</p>
            </div>
            <div
              class="tab-pane"
              id="maintenance"
              role="tabpanel"
              aria-labelledby="maintenance-tab"
            >
              <p>• Attending to maintenance issues</p>
              <p>• Procurement quotations</p>
              <p>• Allocating approved repair work to approved sub-contractors</p>
              <p>• Processing insurance claims, on request.</p>
            </div>
          </div>
        </div>
      </div>
    </div>
  </section>
</template>

<script>
export default {};
</script>

<style lang="scss" scoped></style>
